X-Git-Url: https://git.openstreetmap.org/nominatim-ui.git/blobdiff_plain/3eda144903d23a7a615274d342f06c0e227fb5c3..d6452c758bd00519efc390b5971d8c4e5aaa4267:/src/App.svelte?ds=sidebyside

diff --git a/src/App.svelte b/src/App.svelte
index 3e64b16..54cad5d 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -18,7 +18,7 @@
   refresh_page();
 </script>
 
-// deal with back-button and other user action
+<!-- deal with back-button and other user action -->
 <svelte:window on:popstate={refresh_page} />
 
 <Header/>
