X-Git-Url: https://git.openstreetmap.org/nominatim-ui.git/blobdiff_plain/82eae94284b6f0be5eeb1bc7e90350c4992994bf..c0d1fb859fee050373df1fa77d03cb2c1a8cde91:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index a5b3277..44738f2 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -9,11 +9,12 @@
   let fetch_running = false; // prevent multiple parallel fetch runs
 
   last_api_request_url_store.subscribe(url => {
+    last_api_request_url = url;
+
     if (fetch_running || last_updated_date) return;
 
     fetch_running = true;
 
-    last_api_request_url = url;
     fetch_from_api('status', { format: 'json' }, function (data) {
       last_updated_date = data.data_updated;
       fetch_running = false;
