X-Git-Url: https://git.openstreetmap.org/nominatim-ui.git/blobdiff_plain/a38bffb25fc203f6994be164d514a9b277328e6e..67bde931f365c0f02ddc4e2d1c8f05963e36c59b:/src/pages/DetailsPage.svelte

diff --git a/src/pages/DetailsPage.svelte b/src/pages/DetailsPage.svelte
index 12d19d8..e5325e2 100644
--- a/src/pages/DetailsPage.svelte
+++ b/src/pages/DetailsPage.svelte
@@ -279,6 +279,7 @@
   }
 
   #map-wrapper {
+    position: relative;
     width:100%;
     min-height: auto;
     height:300px;
