X-Git-Url: https://git.openstreetmap.org/nominatim-ui.git/blobdiff_plain/abd37075195703463b062060c71c456f118819c3..daea333875ff6b51d99dea24997019e573e201c2:/src/pages/StatusPage.svelte

diff --git a/src/pages/StatusPage.svelte b/src/pages/StatusPage.svelte
index c3bfb78..1a29d56 100644
--- a/src/pages/StatusPage.svelte
+++ b/src/pages/StatusPage.svelte
@@ -24,7 +24,11 @@
 
       <dl>
         <dt>API Endpoint</dt>
-        <dd><a href={configuration.Nominatim_API_Endpoint}>{configuration.Nominatim_API_Endpoint}</a></dd>
+        <dd>
+          <a href={configuration.Nominatim_API_Endpoint}>
+            {configuration.Nominatim_API_Endpoint}
+          </a>
+        </dd>
 
         <dt>Software version</dt>
         <dd>{aStatusData.software_version}</dd>
