X-Git-Url: https://git.openstreetmap.org/nominatim-ui.git/blobdiff_plain/c061d3fd3d4c9135fdbda0af273d9fc0dc5b5535..72012a070dc88cf6b6ce393a6698a3aa6df10a3c:/src/components/ReverseLink.svelte?ds=sidebyside

diff --git a/src/components/ReverseLink.svelte b/src/components/ReverseLink.svelte
index 2fd2c4c..bbd54d7 100644
--- a/src/components/ReverseLink.svelte
+++ b/src/components/ReverseLink.svelte
@@ -1,8 +1,8 @@
 <script>
 import { refresh_page } from '../lib/stores.js';
 
-export let lat;
-export let lon;
+export let lat = null;
+export let lon = null;
 export let zoom = null;
 export let extra_classes = '';
 
